         180           8
   3.44736489611104        2.71819128882795        2.07162121935846     
   1.42443686210154       0.802179073490444       0.217633966004549     
 -0.321667446772585      -0.801437792609690     
  -5.95436487263379       -5.88911675515255       -6.02071379927984     
  -6.14362125392805       -6.36804141743812       -6.68182217502736     
  -6.95484562620604       -7.21994559927262     
  2.613832661913960E-004  0.000000000000000E+000
  0.992801096385145       0.000000000000000E+000
  0.995457502772351       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
