         180           8
   3.36618120439481        2.72124318390511        2.04041686201538     
   1.38859050474581       0.801665134403966       0.233285100745394     
 -0.328773851304224      -0.797841376990183     
  -5.74916629495301       -5.77734859302519       -5.88409901610449     
  -6.05243793787377       -6.29139367627127       -6.63910301823921     
  -6.91223654624625       -7.21906467232580     
  2.011727712649129E-004  0.000000000000000E+000
  0.992841588239127       0.000000000000000E+000
  0.995471797143224       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
