         180           3
   6.52050740172659        7.92098184430375        9.67334811464243     
   24.3810097905807        24.9821881952232        25.7965445586578     
 -1.652098986048141E-003  0.000000000000000E+000
   1.00129906913822       0.000000000000000E+000
  0.998926259200825       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
