         180           8
 -0.786697155593721      -0.878712295893647       -1.05410537508639     
  -1.16156915127934       -1.32114681569196       -1.47339338442240     
  -1.61536740646267       -1.69651054947450     
  -7.14317998601396       -6.92496682520972       -6.61535171380789     
  -6.31811630767211       -5.95661419768398       -5.49946831369396     
  -5.10281089094853       -4.62846115048280     
  1.031565624819274E-003  0.000000000000000E+000
  0.991431203049982       0.000000000000000E+000
  0.994404780343483       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
