         180           8
 -0.605434589433872      -0.723460848183950      -0.882337109672943     
  -1.09710475550023       -1.30479041951401       -1.41692216956740     
  -1.46544799002823       -1.64316779088224     
  -7.04718424321096       -6.84507314778298       -6.55080664119403     
  -6.18202253296350       -5.79709044202244       -5.43793824808840     
  -4.96325794336602       -4.60429503605450     
  1.100849124883460E-003  0.000000000000000E+000
  0.991383200295262       0.000000000000000E+000
  0.994334876251626       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
