         180           3
   6.52629706202892        7.99335660484808        9.81910554155950     
   24.6831823362402        25.4797439761212        26.1378973701390     
 -1.678474638309685E-003  0.000000000000000E+000
   1.00117610418055       0.000000000000000E+000
  0.998763282217275       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
