         180           8
 -0.478297027616211      -0.635684981846185      -0.834267862215191     
 -0.995501483836992       -1.15245268679014       -1.32759060120083     
  -1.41984004648558       -1.59709881030534     
  -7.06803085613998       -6.86814558119090       -6.51621891567823     
  -6.15804241871493       -5.76542675764031       -5.33733157612416     
  -4.91982828506126       -4.59105569688512     
  1.109755153104239E-003  0.000000000000000E+000
  0.991391977199058       0.000000000000000E+000
  0.994350936713288       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
