         180           8
 -0.458919984210425      -0.637879889921851      -0.863067640172331     
  -1.04044741813747       -1.19424608453190       -1.36247682890726     
  -1.47703726537508       -1.67223555426198     
  -6.94146075147740       -6.90570417314466       -6.50626978520763     
  -6.18052928488494       -5.79471945157887       -5.36096471459627     
  -4.94211147315078       -4.54590903902682     
  1.096783257559869E-003  0.000000000000000E+000
  0.991436653162369       0.000000000000000E+000
  0.994319470244806       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
