         180           8
  -1.62163289956065       -1.87003013898458       -1.99775394046048     
  -2.17494002562885       -2.29434713727487       -2.38481106193706     
  -2.50434483202081       -2.60463372616608     
  -6.07467693195096       -5.82410849369158       -5.52431504629933     
  -5.19302693385306       -4.79712534401016       -4.36537003554405     
  -3.92056414325122       -3.48519856593054     
  1.655801618885560E-003  0.000000000000000E+000
  0.990254071018781       0.000000000000000E+000
  0.993255099586164       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
