         180           8
  -1.38611511552157       -1.68485175406676       -1.82917102011912     
  -2.01668215461838       -2.15823677820734       -2.33911748094338     
  -2.47781106120997       -2.65059378818735     
  -6.15791072252160       -6.00909061644927       -5.65839325380992     
  -5.34473268035552       -4.91460110012894       -4.46099761707628     
  -4.01546327443108       -3.62823702101663     
  1.577448189421895E-003  0.000000000000000E+000
  0.990349085119370       0.000000000000000E+000
  0.993172876701691       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
