         180           8
  -1.38620478484472       -1.57885678977978       -1.74208445203268     
  -1.90358444193060       -2.07437831577899       -2.24633463048212     
  -2.39018150071776       -2.53692628677112     
  -6.94067329582969       -6.68345278214533       -6.30221706267598     
  -5.93048007751947       -5.52523901172812       -5.02998906930859     
  -4.55191436238800       -4.10443539129688     
  1.372153596708936E-003  0.000000000000000E+000
  0.990599734123377       0.000000000000000E+000
  0.993319375388377       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
