         180           8
 -0.667749189635565      -0.853668519462452       -1.03663827904939     
  -1.30152649539470       -1.48538151598746       -1.67587182028519     
  -1.94128812230192       -1.99406816116691     
  -7.75938428261919       -7.63577690315301       -7.33925836169506     
  -6.98537152371817       -6.51018895788219       -6.07441760496736     
  -5.61928272768328       -5.10424635540554     
  1.282034516127823E-003  0.000000000000000E+000
  0.990723092591295       0.000000000000000E+000
  0.993598590621323       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
