         180           8
 -0.247740314464354      -0.528958543118734      -0.731016965113484     
 -0.954740987135022       -1.09255906461998       -1.29232285134264     
  -1.50980928655973       -1.67307426803638     
  -8.84978294283949       -8.60434908274379       -8.38492853401563     
  -8.02433904844698       -7.48214235098756       -6.94687803819044     
  -6.40947033441976       -6.12161189544237     
  9.786545963411972E-004  0.000000000000000E+000
  0.991255552420671       0.000000000000000E+000
  0.993958036185528       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
