         180           8
  0.296474103779639       0.149168500257538      -5.345251441000008E-002
 -0.223700851760459      -0.372211541660170      -0.504739162101633     
 -0.643534120736527      -0.565515270072296     
  -9.77063062192548       -9.48898832497639       -9.18749593870430     
  -8.81321372610501       -8.40623929492481       -7.99715054769125     
  -7.55836303477587       -7.20456452489822     
  6.353791667609661E-004  0.000000000000000E+000
  0.991769660861346       0.000000000000000E+000
  0.994302610066739       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
