         179           8
  -107.550349617675       -79.9008042506364       -68.1462832628188     
  -74.1796412891624       -80.8298756837918       -90.5305951782433     
  -91.1092914504171       -99.5893736351387     
   141.376268447781        116.939832320270        79.4139563259551     
   39.1204392084313        9.21666743939972       -11.3910251601886     
  -33.7226620262707       -42.1334626877168     
 -1.384110721506995E-002  0.000000000000000E+000
   1.01987040502098       0.000000000000000E+000
  0.983632300148697       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
