         180           3
   13.6140087011017        11.4880189375794        9.30410537111825     
   24.0737140106348        24.4980844365966        25.2259252735025     
 -1.617455810840992E-003  0.000000000000000E+000
   1.00145532124257       0.000000000000000E+000
  0.998669906269341       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
