         180           8
   2.16642935716819        1.57545193446710       0.908783222015084     
  0.275128321217263      -0.341526565198252      -0.885762834273279     
  -1.43981516567925       -1.96504885709394     
  -4.11175993768086       -4.15740669656710       -4.34902507850842     
  -4.48408535436748       -4.58085995759517       -4.84068181220436     
  -5.16448907088283       -5.22845029946355     
  9.403614959623144E-004  0.000000000000000E+000
  0.991597341255180       0.000000000000000E+000
  0.994231490510004       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
