         180           8
   2.34538151838124        1.69158981928138        1.01698455940237     
  0.385020541155605      -0.234906328990983      -0.845888671995216     
  -1.41490070474670       -1.85782756264782     
  -4.08099812179707       -4.25241525368620       -4.33677708790638     
  -4.49506859135645       -4.73315955199351       -5.03493919054371     
  -5.27985494310406       -5.36992622809589     
  9.167297824761437E-004  0.000000000000000E+000
  0.991595652335142       0.000000000000000E+000
  0.994275379485237       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
