         180           8
   2.40340704078764        1.64521931540358        1.01071209463030     
  0.350861829554968      -0.239435193060916      -0.827239852958157     
  -1.39405269435599       -1.82505904325726     
  -4.10921590937667       -4.36393214090691       -4.44600030978162     
  -4.57455908824767       -4.79824242415955       -5.06543637826859     
  -5.26616590964765       -5.34011233358786     
  9.094934227734094E-004  0.000000000000000E+000
  0.991675808306970       0.000000000000000E+000
  0.994353184801054       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
