         180           8
   13.2850162045853        12.7049349532611        12.1403928461498     
   11.5737015546264        10.9783998327397        10.3827923690834     
   9.79789523710524        9.21607787985213     
   23.9815733183720        23.9828315782601        24.1332387614393     
   24.3732321934291        24.5605601062403        24.7441306067293     
   24.9798934990802        25.3854565389778     
 -1.637323443446141E-003  0.000000000000000E+000
   1.00139001156426       0.000000000000000E+000
  0.998585429385603       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
