         180           8
   2.22883623879816        1.55582811135625       0.888812513744607     
  0.266689458739481      -0.290727462231471      -0.851929983402387     
  -1.42602946474564       -1.93440628820737     
  -4.37620109176775       -4.53322745587952       -4.62547331774430     
  -4.71621978225664       -4.89278547235476       -5.11350292549076     
  -5.30763570348177       -5.40943011791069     
  8.175658079083953E-004  0.000000000000000E+000
  0.991815975752628       0.000000000000000E+000
  0.994282877973537       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
