         180           8
 -4.410250019196760E-002 -0.333955414670078      -0.469144465988606     
 -0.640405258137136      -0.792108247528247      -0.932591761519758     
  -1.04978088629982       -1.26983354421885     
  -8.67218653400850       -8.40547446779302       -8.06358967707233     
  -7.70095260390553       -7.30662307343595       -6.88452422144191     
  -6.50212856229848       -5.98583989530463     
  9.549774310456109E-004  0.000000000000000E+000
  0.991341822293473       0.000000000000000E+000
  0.994129845459665       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
