         180           8
 -0.200974429165572      -0.369459626710648      -0.568514395044289     
 -0.724069400827692      -0.856041413744114       -1.00685926214926     
  -1.13606066616275       -1.24798357912430     
  -8.54534314844355       -8.38203375744809       -8.06379466589924     
  -7.69615977856424       -7.31504159082298       -6.90606408281180     
  -6.45394787865971       -6.06630425631999     
  9.249294739461632E-004  0.000000000000000E+000
  0.991386329367624       0.000000000000000E+000
  0.994256948899814       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
