         180           8
 -2.829371283072069E-002 -0.225005530687854      -0.424491864884890     
 -0.585103335093515      -0.737667793109597      -0.897258980446537     
  -1.01942279014080       -1.12576167444124     
  -8.61365523674650       -8.41848701235297       -8.14223726140936     
  -7.80905491066593       -7.38236608379906       -6.93561816392107     
  -6.50067225683931       -6.12272578947867     
  9.029855209362315E-004  0.000000000000000E+000
  0.991480275803664       0.000000000000000E+000
  0.994341942241057       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
