         180           8
  0.150619428246801      -4.216553825014390E-002 -0.185645999267195     
 -0.362312751514110      -0.514342663053843      -0.654841120140579     
 -0.770404040537981      -0.988099476728414     
  -8.42858177222312       -8.26830987040867       -7.99981522980634     
  -7.66390665046214       -7.25302999703694       -6.86601034952209     
  -6.45011357316364       -6.13396939932899     
  8.423776900667176E-004  0.000000000000000E+000
  0.991760010611355       0.000000000000000E+000
  0.994549276536478       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
