         180           8
  0.251793222621002       0.101038940164709      -0.139235778945545     
 -0.366446172788433      -0.520215569918893      -0.675012515708340     
 -0.837070821911856      -0.892023623795997     
  -8.51749686150633       -8.32505167720787       -8.01406797796713     
  -7.67614926418738       -7.24260347109962       -6.82340868869588     
  -6.44312396871975       -6.01387357736522     
  7.644777442919703E-004  0.000000000000000E+000
  0.991826049718264       0.000000000000000E+000
  0.994723375921674       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
