         180           3
   7.01213926952047        8.46116978671302        10.1509545052541     
   24.9872858482522        25.5579347217981        26.2816608999066     
 -1.817340511980273E-003  0.000000000000000E+000
   1.00104769001787       0.000000000000000E+000
  0.998129792592544       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
