         180           8
 -0.439384092741112      -0.709993200798012      -0.852707414527865     
  -1.00747142595022       -1.20519135884029       -1.39146320277153     
  -1.53298119442943       -1.59046172620117     
  -7.54849345938374       -7.42204616092316       -7.14539839212493     
  -6.84310680376759       -6.44458880237862       -6.01331800468761     
  -5.60685298796754       -5.24793683611370     
  1.207761278734589E-003  0.000000000000000E+000
  0.990900301551720       0.000000000000000E+000
  0.993780216128184       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
