         180           8
   1.77064483147521        1.50310536822022        1.35357510814448     
   1.18169113371717        1.00307635447466       0.857549757293754     
  0.749781386431752       0.576123939270128     
  -12.1875645109541       -11.9207102861334       -11.5740047452145     
  -11.2250347851470       -10.7960130642136       -10.3685894519682     
  -9.94348562239989       -9.65675158776120     
 -1.212271097058472E-004  0.000000000000000E+000
  0.992646086319031       0.000000000000000E+000
  0.995638367884903       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
