         180           8
   1.72967918970506        1.54130939658716        1.41711363292065     
   1.26140804270357        1.11021030874775        1.00551310409378     
  0.931332223714952       0.803181847418304     
  -11.9183209479760       -11.7770770272488       -11.4803727840204     
  -11.1100242031574       -10.7306223043956       -10.3355833109796     
  -9.93843854003877       -9.50503949826960     
 -1.479722311582783E-004  0.000000000000000E+000
  0.992616166421902       0.000000000000000E+000
  0.995539684404238       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
