         180           8
   1.71111875966813        1.56471278629192        1.44876041271214     
   1.30829209357202        1.17229634362726        1.04102661697181     
  0.920145646865679       0.735315247855430     
  -11.8285746351125       -11.6833998900681       -11.3298949309175     
  -10.9639357336694       -10.5457873147656       -10.1234139886346     
  -9.72774815995403       -9.29839480393042     
 -7.941109962063497E-005  0.000000000000000E+000
  0.992578873299440       0.000000000000000E+000
  0.995505724210933       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
