         180           3
   4.06673606591656        5.72809196437257        7.88191651738476     
   16.4751054834071        17.0006966125113        17.7569049051413     
 -1.726117463581314E-003  0.000000000000000E+000
   1.00127365397752       0.000000000000000E+000
  0.998335949599751       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
