         180           8
   1.56134006099509        1.42884781514781        1.29210794813895     
   1.14136359428763        1.01240074672208       0.903053201085205     
  0.786851457649824       0.632402065113601     
  -11.6776051767976       -11.4383014203879       -11.1534013575133     
  -10.8276884476262       -10.4118328329742       -9.98185801725835     
  -9.60455679140956       -9.16696743066878     
 -4.674716427394306E-005  0.000000000000000E+000
  0.992658230573654       0.000000000000000E+000
  0.995580514087802       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
