         180           8
 -0.394053704829227      -0.661363229153512      -0.837217600046146     
 -0.979732381963947       -1.08077869949106       -1.20947373825025     
  -1.32503352737243       -1.55057805990812     
  -7.44676841205705       -7.37335250095346       -7.06839198113146     
  -6.75298634996895       -6.41475748714955       -5.99483997897219     
  -5.59616336526442       -5.05453934521645     
  1.120907124818714E-003  0.000000000000000E+000
  0.990661676637034       0.000000000000000E+000
  0.993621975421836       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
