         180           3
   4.77447287812620        6.22116571446160        8.28271122466529     
   13.7216348993259        14.2001449007523        14.9313452940984     
 -1.035100320557770E-003  0.000000000000000E+000
   1.00107109351976       0.000000000000000E+000
  0.998028034439108       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
