         180           8
  0.253940249664554       5.599272196617636E-003 -0.211486680090298     
 -0.438156792085989      -0.632386955969407      -0.819615550887357     
  -1.05779565672773       -1.32971947172610     
  -8.21888467072943       -7.91199208994803       -7.61280366214940     
  -7.30232489983059       -6.91154174736781       -6.48209829050255     
  -6.07235383758419       -5.54015128220966     
  8.315652494636761E-004  0.000000000000000E+000
  0.990972595375416       0.000000000000000E+000
  0.993838193264474       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
