         180           3
   5.82399498173015        3.80506743982592        1.93178817092893     
   12.4963911495080        13.4020538619247        14.5066594700615     
 -1.574256070770136E-003  0.000000000000000E+000
   1.00046695207736       0.000000000000000E+000
  0.998429683220592       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
