         180           8
 -0.593845635774098       -1.05992495320740       -1.40826645108360     
  -1.72108564263770       -1.98028173527432       -2.23592803744118     
  -2.41612641309729       -2.63189569316043     
  -9.06723921865314       -9.23659393876686       -9.51531916543823     
  -9.79261406019847       -10.0798622942337       -10.3471783130658     
  -10.6428872994383       -10.7504542657477     
  8.233052756728368E-004  0.000000000000000E+000
  0.990726009390555       0.000000000000000E+000
  0.993829250437466       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
