         180           8
 -0.702800178245145       -1.07908839752042       -1.40976231233639     
  -1.72059054374463       -1.97171098280716       -2.13569575737756     
  -2.33801299635393       -2.61011859980187     
  -8.93785683190070       -9.22579384067397       -9.49678333474799     
  -9.74967732201808       -10.0020611962507       -10.2362030581835     
  -10.5132335811921       -10.6455817657589     
  8.215556688702826E-004  0.000000000000000E+000
  0.990767421723537       0.000000000000000E+000
  0.993715349287332       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
