         180           8
 -0.601341945269704       -1.07319329485009       -1.50836636286652     
  -1.85211482836929       -2.02842871643100       -2.18809532590869     
  -2.42683270784085       -2.65945611521386     
  -8.92232929973651       -9.24581218059539       -9.48943709549425     
  -9.77038145185119       -10.1150961083991       -10.3666796818367     
  -10.6472546345613       -10.7834447720154     
  8.178202251488469E-004  0.000000000000000E+000
  0.990570575634857       0.000000000000000E+000
  0.993649238636617       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
