         180           8
 -0.296852693352570      -0.527159019673219      -0.943779641297466     
  -1.34561123540031       -1.64142353135543       -1.84983005054885     
  -2.07998567528281       -2.21181245606687     
  -9.06392826504075       -9.29857817486669       -9.55603045180322     
  -9.81073153961744       -10.1159058189158       -10.4156039228488     
  -10.6525382135138       -10.8308732117445     
  7.679117577422197E-004  0.000000000000000E+000
  0.990768285968546       0.000000000000000E+000
  0.993706516606078       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
