         180           8
 -6.767001314682549E-003 -0.423706057881759      -0.837675513460403     
  -1.17979154155060       -1.43865260103174       -1.65123176601977     
  -1.87384999656421       -1.99328193767185     
  -8.81022852497033       -9.17572913202967       -9.39681127546890     
  -9.70993738545860       -10.0232729841279       -10.2663644449385     
  -10.5879219574261       -10.7724345937068     
  7.898157642946862E-004  0.000000000000000E+000
  0.990811016241028       0.000000000000000E+000
  0.993881363806495       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
