         180           8
   3.35592697944745        2.72432311530465        2.10737979617521     
   1.47797655544568       0.853018097061574       0.272040207273249     
 -0.262149655736871      -0.841032169473181     
  -6.81842636907332       -6.84373133985069       -6.98164391714649     
  -7.13313071595197       -7.33920345979836       -7.61412606160244     
  -7.87738791146583       -7.93958613138115     
  2.366713770805321E-004  0.000000000000000E+000
  0.992165398146085       0.000000000000000E+000
  0.994910407131290       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
