         180           8
   3.65053508776826        2.99148815149731        2.28161716396762     
   1.61473252837301       0.988059451858093       0.371224678534327     
 -0.212295581146382      -0.657365702438526     
  -6.83827549172270       -6.88801990834996       -7.06839452312558     
  -7.27586761310032       -7.49204372362862       -7.78155116690643     
  -8.01355789810547       -8.22987083066594     
  1.515992521333656E-004  0.000000000000000E+000
  0.992473478089005       0.000000000000000E+000
  0.995170143117320       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
