         180           8
  0.482829613551120       0.288435252605917       0.126597721650495     
 -5.460517073426804E-002 -0.192347272451063      -0.324809786822139     
 -0.467232765575757      -0.626806818241624     
  -10.2719223525720       -10.0290364450239       -9.74973522094355     
  -9.39148957253854       -9.01790573551254       -8.62748347123844     
  -8.22409139325194       -7.74052529725071     
  4.667360804212489E-004  0.000000000000000E+000
  0.991831509149196       0.000000000000000E+000
  0.994515806556748       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
