         180           8
  0.778599204004129       0.529045681489596       0.385323563295059     
  0.215883924515199       8.691724005609172E-002 -4.978730393856740E-002
 -0.138861927061388      -0.275422663517661     
  -10.4863068942607       -10.2683655051951       -9.96548197274126     
  -9.57068462995746       -9.13551052247033       -8.64026603703732     
  -8.13079543948987       -7.63700357773970     
  4.543067770744201E-004  0.000000000000000E+000
  0.991793056644594       0.000000000000000E+000
  0.994540442274953       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
