         180           8
  0.655382293822066       0.522651938862481       0.345624017057275     
  0.207026908998557       5.952838500390192E-002 -8.227290750701974E-002
 -0.150843054908332      -0.452372335622357     
  -10.4346915603490       -10.2772435789653       -9.94811421573483     
  -9.59208254537300       -9.19137319472591       -8.78346403699152     
  -8.37355394795566       -7.89980164030744     
  4.231624946159502E-004  0.000000000000000E+000
  0.991801332616145       0.000000000000000E+000
  0.994564582230530       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
