         180           3
   4.41364565921958        2.35965938594498        1.00607792019652     
   11.3602267220786        11.5939366920189        11.8076167309123     
 -1.358303616146713E-003  0.000000000000000E+000
   1.00141571406468       0.000000000000000E+000
  0.998561500622289       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
