         180           8
 -0.457890810610742      -0.815709187718762       -1.13412828457563     
  -1.52101102635021       -1.79439625254238       -2.05320790296116     
  -2.20526339573730       -2.41076375087820     
  -10.6734771958086       -10.9463942598055       -11.2377006049350     
  -11.4950695329875       -11.6863082718934       -11.9477734471909     
  -12.2615107742317       -12.4257617070226     
 -4.360067658476087E-005  0.000000000000000E+000
  0.991262772568062       0.000000000000000E+000
  0.993756237549458       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
