         180           3
   4.24979487194926        2.25090152760074        1.11925911608093     
   11.8974570934594        12.0967343580477        12.2377086328206     
 -1.175260989324529E-003  0.000000000000000E+000
   1.00124308823621       0.000000000000000E+000
  0.998724147125831       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
